[HLP:1022.hlp]

11-Jan-82  Version 114E(46) is on the system.

This version has many new PL1022 (DPL was the old name for this) features.
Especially the IF command, along with WHILE, REPEAT, etc.  Old programs
should still work, as long as SYSIFTYPE = 0 [default].

To print documentation on the new features, type
        PRINT DOC:1022.14E/forms:narrow

The DOC:1022.DOC manual has NOT been revised---the DOC:1022.HST manual IS NEW.

We expect a complete update on the 1022.DOC in the future, and at that
time, a complete new 1022 reference guide manual will be available to insert
in the 3-ring binders which most people have (will be around $10).

[End of Version 114E news]


        Classes which teach a basic introduction to using 1022
are offered once every month or two.  To sign up for the next
class, or find out when it will be offered, call 543-9275.

        System 1022 is  a  sophisticated,  general  purpose,
data  management  software  system  designed  for use on the
DECsystem-10.  This system is suitable for  an  aplication
involving  generation, storage, maintenance, or retrieval of
information  for  both   conversational   time-sharing   and
production-mode batch applications.


        To run System 1022, simply type

                R 1022

        Documentation on the package  is  contained  in  several
files in addition to the two main manuals available for sale
in the Locke Computer Office.
These manuals include a 3-ring binder and chapter dividers:
        USERS REFERENCE MANUAL          $16.50  ($10.00 to print below +
                                                $2.25 for binder)
        HOST INTERFACE MANUAL           $8      ($3.37 to print below +
                                                $2.25 for binder)

   To print these on the lineprinter, type

PRINT DOC:1022.DOC/FORMS:NARROW   (for  the  User's  Reference Manual)
PRINT DOC:1022.HST/FORMS:NARROW   (for  the  host  FORTRAN  or COBOL interfaces)
PRINT DOC:1022RG.DOC/FORMS:NARROW       (for the report generator detailed
                                       pogrammer's document)
PRINT DOC:1022PR.IMR/FORMS:NARROW   (for the beginner's primer; NOTE: this
                                   printout has blanks spaces where diagrams
                                   should be.  A copy complete with diagrams
                                   can be purchased from the office.)
PRINT DOC:1022.IRG/FORMS:NARROW     (for the interactive report-generator)

        (The  /FORMS:NARROW  means to print it on narrow paper.
        If a 1-inch left margin is needed, use /FORMS:NARWID.)

There is a graphics program that can be used directly with 1022 data sets.
It uses a Tektronix terminal and also be used to make plots on the Calcomp
ploter and Printronix printer.  See HELP TEK22.


[End of 1022.hlp]

.KJOB
