[ HLP:GLIM.HLP  1 page]

GLIM is a system for Generalised Linear Interactive Modelling.
It is a powerful statistical analysis package from NAG (the
Numerical Algorithms Group, Oxford, England) and the Royal
Statistical Society.  Manuals are available in the Locke library.
To run GLIM type

    R GLIM      for data space of approx.  5000
or
    R GLIM2     for data space of approx. 15000


[end of HLP:GLIM.HLP]

.KJOB
.
