[HLP:POUT.HLP  1 page]

POUT is a Pause OUTput TECO macro.
This macro produces paused output for use with single sheets.
If file to be printed is AB.T, type TECO AB.T; then EIPOUT$$
The "$" stands for the <ESCAPE> key.
The macro will output a form-feed, then wait for any character to be
typed as a signal to begin outputting the first page.  The signal
character is not echoed.  A signal character of "r" or "R" will
repeat the current page. Do not use <CR> for the signal--that is
accepted as 2 characters and will give 2 pages.

At the end of the file, a final form-feed
will be given; then a final signal character will exit.
To skip the first N pages, give a N<EY>$$ command before the EIPOUT.

[end of POUT.HLP (DAT)]

.KJOB
.
