SYSDPY.HLP

SYSDPY is a direct-cursor-updated continuous display of SYSTAT information
for jobs running on the DEC-10.  Various versions exist for terminals as
follows:

        Version         Terminal
        -------         --------
        SADM            ADM-3a
        S               OMRON
        HUMAN           HDS Concept
        DECDPY          VT100
        VT52            VT52
        FOXY            Perkin-Elmer FOX 1100

For help after running the program, type the single character H.
No carriage return is required for commands to SYSDPY programs.
Eg:  to run SYSDPY on an ADM-3a terminal, type   R SADM

[End of HELP SYSDPY]

.KJOB
.
